22
Thanks for using MedLink! The Most comprehensive Medical Information Door
Available.  

MAIN MENU HELP FILE:

If using ansi, you navigate the main menu by doing the following:
U -  The U key moves the lite bar UP
D -  The D key moves the lite bar DOWN
[ENTER] - This selects the funtion highlighted by the lite bar
You can also select Letters in Red in the "Buttons":
H -  Displays this file
B -  Quits to the BBS

If using Ascii, select the numbers from 1 to 10 or B or H.

The rest is self explanatory.  If you're having trouble the sysop of this
system can edit this help file to include answers to any problems the user
is having.

!
